Computing Facilities for HEP at the Institute of Nuclear Physics of the Moscow State University

Status Report

Component Status External Networking Future Plans

PEOPLE (fraction-of-time jobs): A. Solomin - project manager V. Mileev - software manager V. Sinolitz - system administrator G. Iordansky - hardware maintainer

Component Status

SGI platform - supported - IRIX 6.5.5 (service

contract)

Power Challenge R8000 1 - general server 128 MB Indy/Indigo R4XXX 6 - workgroup svrs.

96 MB

Old SGI - IRIX 5.3 :

Indigo/Pesonal IRIS R3000 23 - "screens"

Linux PC several - anything HP LaserJet IIISi EXABYTE

For D0:

Indy R4400 workgroup server + workseat for each physicist, ~ 15 GB of diskspace.

External Network Connectivity

α − FERMILAB, CERN & DESY: ~ 10 KB/s ω − The rest of the world: ~ 1 KB/s

Future Plans

1. New LINUX compute server (4 x IA64’s from SGI?) with large enough disk space

2. Replacement of old workstations with THIN network computers

2a. 100-Mb networking

4. Color printer