D0 Prague Farm

Table generated on 09 Oct 2000 at 12:58:15 UT

computer load avg. memory usage free disk space d0lxpr1 1.03 (1.03/cpu) 123492 kB, 96% 1663 MB, 15% ipnp08 1.00 (1.00/cpu) 105636 kB, 41% 2477 MB, 16% linux098c 2.00 (1.00/cpu) 178260 kB, 69% 2012 MB, 9% linux115c 1.00 (1.00/cpu) 93228 kB, 73% 690 MB, 9% zirafa 0.00 (0.00/cpu) 11500 kB, 37% 35 MB, 6%

Generated by farm_control on 09 Oct 2000 at 12:58:15 UT, AK