DØ computing in Prague

6^{th} February 2001

Alexander Kupčo, Institute of physics AV ČR

Manpower – Alexander Kupčo – Miloš Lokajíček – Karel Smolek – Karel Soustružník New hardware – new 2 PC Linux farms (Brno, Prague) – 16+1 dual processor computers – CPU PIII 733 MHz, 1GB memory, 9GB hard drive – CESNET, project DATAGRID – in long term we will be allow to use about 50% of resources – 1TB disk array (about 200GB dedicated for DØ)

Software status – production release p05.00.04 – switch to new version of mc runjob – Heidi’s tar file for new version of d0reco not tested yet – problems:

• some missing RCP files in new version of mc runjob • we used that from version 2.2.9 – we can run isajet, pythia, d0gstar and d0sim – we still cannot run d0reco Production status – made a lot of test productions – minimum bias data: 64 kEvents – to do list

• test d0sim production (to see if one fileserver for minimum bias is enough) • try to transfer the data to the Fermilab (test mc runjob python scripts, test network connection on large amount of the data) • install new version of d0reco